<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.4.2">
<drawing>
<board>
<plain>
<wire x1="0" y1="0" x2="59.162" y2="0" width="0" layer="20"/>
<wire x1="59.162" y1="0" x2="59.162" y2="25.832" width="0" layer="20"/>
<wire x1="59.162" y1="25.832" x2="0" y2="25.832" width="0" layer="20"/>
<wire x1="0" y1="25.832" x2="0" y2="0" width="0" layer="20"/>
<hole x="2.286" y="11.049" drill="0.35"/>
<hole x="36.576" y="11.049" drill="0.35"/>
</plain>
<libraries>
<library name="fab">
<packages>
<package name="R1206FAB">
</package>
<package name="LED1206FAB">
<description>LED1206 FAB style (smaller pads to allow trace between)</description>
</package>
</packages>
</library>
<library name="Rembrandt Electronics - JST XH Connectors v1-0">
<packages>
<package name="JST-XH-07-PACKAGE-ROUND-PAD">
<description>&lt;b&gt;JST XH Connector Round Pads (Package)&lt;/b&gt;&lt;p&gt;

Wire to board connector.

Pitch: 2,54 mm, (0.100")&lt;p&gt;
Number of pins: &lt;b&gt;7&lt;/b&gt;&lt;b&gt;&lt;P&gt;

&lt;b&gt;Created by Rembrandt Electronics&lt;/b&gt;&lt;p&gt;
&lt;b&gt;www.rembrandtelectronics.com&lt;/b&gt;&lt;p&gt;</description>
</package>
</packages>
</library>
<library name="pinhead">
<description>&lt;b&gt;Pin Header Connectors&lt;/b&gt;&lt;p&gt;
&lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
<package name="1X08">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="1X03">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="R1" library="fab" package="R1206FAB" value="10k">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="U$1" library="fab" package="LED1206FAB" value="PhotoTransistor">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="X1" library="Rembrandt Electronics - JST XH Connectors v1-0" package="JST-XH-07-PACKAGE-ROUND-PAD" value="I2C">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="JP1" library="pinhead" package="1X08" value="MMA8451 Accelerometer">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="JP2" library="pinhead" package="1X03" value="PhotoSnsr">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
</elements>
<signals>
<signal name="GND">
<contactref element="X1" pad="2"/>
<contactref element="JP1" pad="2"/>
<contactref element="JP2" pad="3"/>
<contactref element="R1" pad="2"/>
</signal>
<signal name="VCC">
<contactref element="X1" pad="1"/>
<contactref element="JP1" pad="1"/>
<contactref element="U$1" pad="1"/>
<contactref element="JP2" pad="1"/>
</signal>
<signal name="SCL">
<contactref element="X1" pad="3"/>
<contactref element="JP1" pad="6"/>
</signal>
<signal name="SDA">
<contactref element="X1" pad="4"/>
<contactref element="JP1" pad="7"/>
</signal>
<signal name="INT0">
<contactref element="JP1" pad="5"/>
<contactref element="X1" pad="6"/>
</signal>
<signal name="INT1">
<contactref element="JP1" pad="4"/>
<contactref element="X1" pad="5"/>
</signal>
<signal name="ADDR">
<contactref element="X1" pad="7"/>
<contactref element="JP1" pad="8"/>
</signal>
<signal name="3V0">
<contactref element="JP1" pad="3"/>
</signal>
<signal name="N$2">
</signal>
<signal name="N$3">
</signal>
<signal name="ADC5">
<contactref element="U$1" pad="2"/>
<contactref element="R1" pad="1"/>
<contactref element="JP2" pad="2"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
