<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.4.2">
<drawing>
<schematic>
<libraries>
<library name="Rembrandt Electronics - JST XH Connectors v1-0">
<packages>
<package name="JST-XH-02-PACKAGE-LONG-PAD">
<description>&lt;b&gt;JST XH Connector Long Pads (Package)&lt;/b&gt;&lt;p&gt;

Wire to board connector.

Pitch: 2,54 mm, (0.100")&lt;p&gt;
Number of pins: &lt;b&gt;2&lt;/b&gt;&lt;b&gt;&lt;P&gt;

&lt;b&gt;Created by Rembrandt Electronics&lt;/b&gt;&lt;p&gt;
&lt;b&gt;www.rembrandtelectronics.com&lt;/b&gt;&lt;p&gt;</description>
</package>
<package name="JST-XH-02-PACKAGE-ROUND-PAD">
<description>&lt;b&gt;JST XH Connector Round Pads (Package)&lt;/b&gt;&lt;p&gt;

Wire to board connector.

Pitch: 2,54 mm, (0.100")&lt;p&gt;
Number of pins: &lt;b&gt;2&lt;/b&gt;&lt;b&gt;&lt;P&gt;

&lt;b&gt;Created by Rembrandt Electronics&lt;/b&gt;&lt;p&gt;
&lt;b&gt;www.rembrandtelectronics.com&lt;/b&gt;&lt;p&gt;</description>
</package>
</packages>
<symbols>
<symbol name="M">
<pin name="S" direction="pas"/>
</symbol>
<symbol name="MV">
<pin name="S" direction="pas"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="JST-XH-02-PIN" prefix="X">
<description>&lt;b&gt;JST XH Connector 2 Pin&lt;/b&gt;&lt;p&gt;

Wire to board connector.

Pitch: 2,54 mm, (0.100")&lt;p&gt;
Number of pins: &lt;b&gt;2&lt;/b&gt;&lt;b&gt;&lt;P&gt;

&lt;b&gt;Created by Rembrandt Electronics&lt;/b&gt;&lt;p&gt;
&lt;b&gt;www.rembrandtelectronics.com&lt;/b&gt;&lt;p&gt;</description>
<gates>
<gate name="-2" symbol="M"/>
<gate name="-1" symbol="MV"/>
</gates>
<devices>
<device name="-LONG-PAD" package="JST-XH-02-PACKAGE-LONG-PAD">
<connects>
<connect gate="-1" pin="S" pad="1"/>
<connect gate="-2" pin="S" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-ROUND-PAD" package="JST-XH-02-PACKAGE-ROUND-PAD">
<connects>
<connect gate="-1" pin="S" pad="V"/>
<connect gate="-2" pin="S" pad="G"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
<library name="supply1">
<description>&lt;b&gt;Supply Symbols&lt;/b&gt;&lt;p&gt;
 GND, VCC, 0V, +5V, -5V, etc.&lt;p&gt;
 Please keep in mind, that these devices are necessary for the
 automatic wiring of the supply signals.&lt;p&gt;
 The pin name defined in the symbol is identical to the net which is to be wired automatically.&lt;p&gt;
 In this library the device names are the same as the pin names of the symbols, therefore the correct signal names appear next to the supply symbols in the schematic.&lt;p&gt;
 &lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
</packages>
<symbols>
<symbol name="VCC">
<pin name="VCC" direction="sup"/>
</symbol>
<symbol name="GND">
<pin name="GND" direction="sup"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="VCC" prefix="P+">
<description>&lt;b&gt;SUPPLY SYMBOL&lt;/b&gt;</description>
<gates>
<gate name="VCC" symbol="VCC"/>
</gates>
<devices>
<device name="">
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="GND" prefix="GND">
<description>&lt;b&gt;SUPPLY SYMBOL&lt;/b&gt;</description>
<gates>
<gate name="1" symbol="GND"/>
</gates>
<devices>
<device name="">
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
<library name="fab">
<packages>
<package name="C1206">
<description>&lt;b&gt;CAPACITOR&lt;/b&gt;</description>
</package>
<package name="C1206K">
<description>&lt;b&gt;Ceramic Chip Capacitor KEMET 1206 reflow solder&lt;/b&gt;&lt;p&gt;
Metric Code Size 3216</description>
</package>
<package name="C1206FAB">
</package>
<package name="LED1206">
<description>LED 1206 pads (standard pattern)</description>
</package>
<package name="LED1206FAB">
<description>LED1206 FAB style (smaller pads to allow trace between)</description>
</package>
<package name="5MM">
<description>5mm round through hole part.</description>
</package>
<package name="R1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;</description>
</package>
<package name="R1206W">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;&lt;p&gt;
wave soldering</description>
</package>
<package name="R1206FAB">
</package>
</packages>
<symbols>
<symbol name="C-US">
<pin name="1" direction="pas"/>
<pin name="2" direction="pas"/>
</symbol>
<symbol name="LED">
<description>LED</description>
<pin name="C" direction="pas"/>
<pin name="A" direction="pas"/>
</symbol>
<symbol name="R-US">
<pin name="2" direction="pas"/>
<pin name="1" direction="pas"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="CAP-US" prefix="C">
<gates>
<gate name="G$1" symbol="C-US"/>
</gates>
<devices>
<device name="1206" package="C1206">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1206K" package="C1206K">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1206FAB" package="C1206FAB">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="LED">
<description>LED</description>
<gates>
<gate name="G$1" symbol="LED"/>
</gates>
<devices>
<device name="" package="LED1206">
<connects>
<connect gate="G$1" pin="A" pad="1"/>
<connect gate="G$1" pin="C" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="FAB1206" package="LED1206FAB">
<connects>
<connect gate="G$1" pin="A" pad="1"/>
<connect gate="G$1" pin="C" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="5MM" package="5MM">
<connects>
<connect gate="G$1" pin="A" pad="IN"/>
<connect gate="G$1" pin="C" pad="OUT"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="RES-US" prefix="R" uservalue="yes">
<description>&lt;b&gt;Resistor (US Symbol)&lt;/b&gt;
&lt;p&gt;
Variants with postfix FAB are widened to allow the routing of internal traces</description>
<gates>
<gate name="G$1" symbol="R-US"/>
</gates>
<devices>
<device name="1206" package="R1206">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1206W" package="R1206W">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1206FAB" package="R1206FAB">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<parts>
<part name="X1" library="Rembrandt Electronics - JST XH Connectors v1-0" deviceset="JST-XH-02-PIN" device="-LONG-PAD" value="5Vin"/>
<part name="X2" library="Rembrandt Electronics - JST XH Connectors v1-0" deviceset="JST-XH-02-PIN" device="-LONG-PAD" value="5V SRVO2"/>
<part name="X3" library="Rembrandt Electronics - JST XH Connectors v1-0" deviceset="JST-XH-02-PIN" device="-LONG-PAD" value="5V SRVO1"/>
<part name="X4" library="Rembrandt Electronics - JST XH Connectors v1-0" deviceset="JST-XH-02-PIN" device="-LONG-PAD" value="5V MC"/>
<part name="X5" library="Rembrandt Electronics - JST XH Connectors v1-0" deviceset="JST-XH-02-PIN" device="-LONG-PAD" value="5V NPXL1"/>
<part name="X6" library="Rembrandt Electronics - JST XH Connectors v1-0" deviceset="JST-XH-02-PIN" device="-LONG-PAD" value="5V NPXL2"/>
<part name="X7" library="Rembrandt Electronics - JST XH Connectors v1-0" deviceset="JST-XH-02-PIN" device="-LONG-PAD" value="5V NPXL3"/>
<part name="P+1" library="supply1" deviceset="VCC" device=""/>
<part name="P+2" library="supply1" deviceset="VCC" device=""/>
<part name="P+3" library="supply1" deviceset="VCC" device=""/>
<part name="P+4" library="supply1" deviceset="VCC" device=""/>
<part name="P+5" library="supply1" deviceset="VCC" device=""/>
<part name="P+6" library="supply1" deviceset="VCC" device=""/>
<part name="GND1" library="supply1" deviceset="GND" device=""/>
<part name="GND2" library="supply1" deviceset="GND" device=""/>
<part name="GND3" library="supply1" deviceset="GND" device=""/>
<part name="GND4" library="supply1" deviceset="GND" device=""/>
<part name="GND5" library="supply1" deviceset="GND" device=""/>
<part name="GND6" library="supply1" deviceset="GND" device=""/>
<part name="C1" library="fab" deviceset="CAP-US" device="1206FAB" value="100nF"/>
<part name="C2" library="fab" deviceset="CAP-US" device="1206FAB" value="1uF"/>
<part name="C3" library="fab" deviceset="CAP-US" device="1206FAB" value="10uF"/>
<part name="U$1" library="fab" deviceset="LED" device="FAB1206"/>
<part name="R1" library="fab" deviceset="RES-US" device="1206FAB" value="499"/>
<part name="P+7" library="supply1" deviceset="VCC" device=""/>
<part name="GND7" library="supply1" deviceset="GND" device=""/>
</parts>
<sheets>
<sheet>
<plain>
</plain>
<busses>
</busses>
<nets>
<net name="VCC">
<segment>
<pinref part="X2" gate="-1" pin="S"/>
<pinref part="P+1" gate="VCC" pin="VCC"/>
</segment>
<segment>
<pinref part="X5" gate="-1" pin="S"/>
<pinref part="P+2" gate="VCC" pin="VCC"/>
</segment>
<segment>
<pinref part="X6" gate="-1" pin="S"/>
<pinref part="P+3" gate="VCC" pin="VCC"/>
</segment>
<segment>
<pinref part="X3" gate="-1" pin="S"/>
<pinref part="P+4" gate="VCC" pin="VCC"/>
</segment>
<segment>
<pinref part="X4" gate="-1" pin="S"/>
<pinref part="P+5" gate="VCC" pin="VCC"/>
</segment>
<segment>
<pinref part="X7" gate="-1" pin="S"/>
<pinref part="P+6" gate="VCC" pin="VCC"/>
</segment>
<segment>
<pinref part="X1" gate="-1" pin="S"/>
<pinref part="C1" gate="G$1" pin="2"/>
<pinref part="C2" gate="G$1" pin="2"/>
<pinref part="C3" gate="G$1" pin="2"/>
<pinref part="P+7" gate="VCC" pin="VCC"/>
<pinref part="R1" gate="G$1" pin="2"/>
</segment>
</net>
<net name="GND">
<segment>
<pinref part="X2" gate="-2" pin="S"/>
<pinref part="GND1" gate="1" pin="GND"/>
</segment>
<segment>
<pinref part="X5" gate="-2" pin="S"/>
<pinref part="GND2" gate="1" pin="GND"/>
</segment>
<segment>
<pinref part="X6" gate="-2" pin="S"/>
<pinref part="GND3" gate="1" pin="GND"/>
</segment>
<segment>
<pinref part="X3" gate="-2" pin="S"/>
<pinref part="GND4" gate="1" pin="GND"/>
</segment>
<segment>
<pinref part="X4" gate="-2" pin="S"/>
<pinref part="GND5" gate="1" pin="GND"/>
</segment>
<segment>
<pinref part="X7" gate="-2" pin="S"/>
<pinref part="GND6" gate="1" pin="GND"/>
</segment>
<segment>
<pinref part="X1" gate="-2" pin="S"/>
<pinref part="C1" gate="G$1" pin="1"/>
<pinref part="C2" gate="G$1" pin="1"/>
<pinref part="C3" gate="G$1" pin="1"/>
<pinref part="GND7" gate="1" pin="GND"/>
<pinref part="U$1" gate="G$1" pin="C"/>
</segment>
</net>
<net name="N$1">
<segment>
<pinref part="R1" gate="G$1" pin="1"/>
<pinref part="U$1" gate="G$1" pin="A"/>
</segment>
</net>
</nets>
</sheet>
</sheets>
</schematic>
</drawing>
</eagle>
