<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="7.3.0">
<drawing>
<library>
<packages>
<package name="MOLEX_MINIFIT_JR">
</package>
<package name="CON_DEBUG_1">
</package>
<package name="CON_DEBUG_2">
</package>
<package name="20020107-G021A01LF">
</package>
<package name="HE14_AUTOCOM_2">
</package>
<package name="HE14_AUTOCOM_3">
</package>
<package name="HE14_AUTOCOM_4">
</package>
<package name="HE14_AUTOCOM_5">
</package>
<package name="HE14_AUTOCOM_6">
</package>
<package name="CON_2X3">
</package>
</packages>
<symbols>
<symbol name="CON_DEBUG_1">
<pin name="1" direction="pas"/>
</symbol>
<symbol name="CON_DEBUG_2">
<pin name="2" direction="pas"/>
<pin name="1" direction="pas"/>
</symbol>
<symbol name="CON_02_GND-VCC">
<pin name="VCC"/>
<pin name="GND"/>
</symbol>
<symbol name="CON_02">
<pin name="2"/>
<pin name="1"/>
</symbol>
<symbol name="CON_06">
<pin name="2"/>
<pin name="1"/>
<pin name="3"/>
<pin name="4"/>
<pin name="5"/>
<pin name="6"/>
</symbol>
<symbol name="CON_03">
<pin name="2"/>
<pin name="1"/>
<pin name="3"/>
</symbol>
<symbol name="CON_04">
<pin name="2"/>
<pin name="1"/>
<pin name="3"/>
<pin name="4"/>
</symbol>
<symbol name="CON_05">
<pin name="2"/>
<pin name="1"/>
<pin name="3"/>
<pin name="4"/>
<pin name="5"/>
</symbol>
<symbol name="CON_06_ISP">
<pin name="MOSI"/>
<pin name="GND"/>
<pin name="MISO"/>
<pin name="SCK"/>
<pin name="/RST"/>
<pin name="VCC"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="MOLEX_MINIFIT_JR">
<gates>
<gate name="G$1" symbol="CON_02_GND-VCC"/>
</gates>
<devices>
<device name="" package="MOLEX_MINIFIT_JR">
<connects>
<connect gate="G$1" pin="GND" pad="GND"/>
<connect gate="G$1" pin="VCC" pad="VCC"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="CON_DEBUG_1" prefix="DBG" uservalue="yes">
<description>Pin to put at the end of not used connexion to use it in case of problems or to debug the output</description>
<gates>
<gate name="G$1" symbol="CON_DEBUG_1"/>
</gates>
<devices>
<device name="PTH" package="CON_DEBUG_1">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="CON_DEBUG_2" prefix="DBG">
<description>Pin to put between to connected parts. In case of problems you can debug the output and even cut the connexion between the two parts.</description>
<gates>
<gate name="G$1" symbol="CON_DEBUG_2"/>
</gates>
<devices>
<device name="" package="CON_DEBUG_2">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name="PTH"/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="20020107-G021A01LF">
<gates>
<gate name="G$1" symbol="CON_02_GND-VCC"/>
</gates>
<devices>
<device name="" package="20020107-G021A01LF">
<connects>
<connect gate="G$1" pin="GND" pad="1"/>
<connect gate="G$1" pin="VCC" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="HE14_AUTOCOM_2">
<gates>
<gate name="G$1" symbol="CON_02"/>
</gates>
<devices>
<device name="" package="HE14_AUTOCOM_2">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="HE14_AUTOCOM_3">
<gates>
<gate name="G$1" symbol="CON_03"/>
</gates>
<devices>
<device name="" package="HE14_AUTOCOM_3">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
<connect gate="G$1" pin="3" pad="3"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="HE14_AUTOCOM_4">
<gates>
<gate name="G$1" symbol="CON_04"/>
</gates>
<devices>
<device name="" package="HE14_AUTOCOM_4">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
<connect gate="G$1" pin="3" pad="3"/>
<connect gate="G$1" pin="4" pad="4"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="HE14_AUTOCOM_5">
<gates>
<gate name="G$1" symbol="CON_05"/>
</gates>
<devices>
<device name="" package="HE14_AUTOCOM_5">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
<connect gate="G$1" pin="3" pad="3"/>
<connect gate="G$1" pin="4" pad="4"/>
<connect gate="G$1" pin="5" pad="5"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="HE14_AUTOCOM_6">
<gates>
<gate name="G$1" symbol="CON_06"/>
</gates>
<devices>
<device name="" package="HE14_AUTOCOM_6">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
<connect gate="G$1" pin="3" pad="3"/>
<connect gate="G$1" pin="4" pad="4"/>
<connect gate="G$1" pin="5" pad="5"/>
<connect gate="G$1" pin="6" pad="6"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="ISP">
<gates>
<gate name="G$1" symbol="CON_06_ISP"/>
</gates>
<devices>
<device name="" package="CON_2X3">
<connects>
<connect gate="G$1" pin="/RST" pad="5"/>
<connect gate="G$1" pin="GND" pad="6"/>
<connect gate="G$1" pin="MISO" pad="1"/>
<connect gate="G$1" pin="MOSI" pad="4"/>
<connect gate="G$1" pin="SCK" pad="3"/>
<connect gate="G$1" pin="VCC" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
</drawing>
</eagle>
