<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="8.7.1">
<drawing>
<schematic>
<libraries>
<library name="fab">
<description>&lt;b&gt;Fablab Library&lt;/b&gt;

&lt;p&gt;This library contains many components found on Fablab's inventory.&lt;/p&gt;</description>
<packages>
<package name="LED1206">
<description>LED 1206 pads (standard pattern)</description>
</package>
<package name="LED1206FAB">
<description>LED1206 FAB style (smaller pads to allow trace between)</description>
</package>
<package name="5MM">
<description>5mm round through hole part.</description>
</package>
<package name="R1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;</description>
</package>
<package name="R1206W">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;&lt;p&gt;
wave soldering</description>
</package>
<package name="R1206FAB">
</package>
<package name="CSRN2010">
<description>&lt;p&gt;Resistence: 0.250 Ohm

&lt;p&gt;Technical specifications:
&lt;ul&gt;
&lt;li&gt;Power rating @ 70°C: 1 W
&lt;li&gt;Dielectric withstanding voltage: 200 V
&lt;/ul&gt;

&lt;p&gt;Manufacturer: Stackpole Electronics Inc.
&lt;p&gt;Digikey code: CSRN2010FKR250CT-ND
&lt;p&gt;&lt;a href="https://www.seielect.com/Catalog/SEI-CSR_CSRN.pdf"&gt;Datasheet&lt;/a&gt;</description>
</package>
<package name="B3SN-3012P">
<description>&lt;p&gt;Digikey code: SW261CT-ND

&lt;p&gt;&lt;a href="http://omronfs.omron.com/en_US/ecb/products/pdf/en-b3sn.pdf"&gt;Datasheet&lt;/a&gt;
&lt;/p&gt;</description>
</package>
<package name="FABRIC_PIN">
</package>
</packages>
<symbols>
<symbol name="LED">
<description>LED</description>
<pin name="C" direction="pas"/>
<pin name="A" direction="pas"/>
</symbol>
<symbol name="R-US">
<pin name="2" direction="pas"/>
<pin name="1" direction="pas"/>
</symbol>
<symbol name="TACTILE_SWITCH">
<pin name="PIN1-2" direction="pas"/>
<pin name="PIN3-4" direction="pas"/>
</symbol>
<symbol name="FABRIC_HOLE">
<pin name="1"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="LED">
<description>LED</description>
<gates>
<gate name="G$1" symbol="LED"/>
</gates>
<devices>
<device name="" package="LED1206">
<connects>
<connect gate="G$1" pin="A" pad="1"/>
<connect gate="G$1" pin="C" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="FAB1206" package="LED1206FAB">
<connects>
<connect gate="G$1" pin="A" pad="1"/>
<connect gate="G$1" pin="C" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="5MM" package="5MM">
<connects>
<connect gate="G$1" pin="A" pad="IN"/>
<connect gate="G$1" pin="C" pad="OUT"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="RESISTOR" prefix="R" uservalue="yes">
<description>&lt;b&gt;Resistor (US Symbol)&lt;/b&gt;
&lt;p&gt;
Variants with postfix FAB are widened to allow the routing of internal traces</description>
<gates>
<gate name="G$1" symbol="R-US"/>
</gates>
<devices>
<device name="1206" package="R1206">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1206W" package="R1206W">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1206FAB" package="R1206FAB">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="_CSRN2010" package="CSRN2010">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="SWITCH_TACTILE" prefix="S" uservalue="yes">
<description>&lt;b&gt;Sealed Tactile Switch (SMT)&lt;/b&gt;

&lt;p&gt;Technical specifications:
&lt;ul&gt;
&lt;li&gt;Rated voltage: 3 to 24 VDC
&lt;li&gt;Rated current: 1 to 50 mA
&lt;li&gt;Operating temperatue: -25 to 70°C
&lt;/ul&gt;

&lt;p&gt;Manufacturer: Omron</description>
<gates>
<gate name="G$1" symbol="TACTILE_SWITCH"/>
</gates>
<devices>
<device name="_W/O_GND" package="B3SN-3012P">
<connects>
<connect gate="G$1" pin="PIN1-2" pad="1 2" route="any"/>
<connect gate="G$1" pin="PIN3-4" pad="3 4" route="any"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="FABRIC_PIN">
<gates>
<gate name="G$1" symbol="FABRIC_HOLE"/>
</gates>
<devices>
<device name="" package="FABRIC_PIN">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<parts>
<part name="U$1" library="fab" deviceset="LED" device="FAB1206"/>
<part name="R1" library="fab" deviceset="RESISTOR" device="1206FAB" value="499 Ohm"/>
<part name="S1" library="fab" deviceset="SWITCH_TACTILE" device="_W/O_GND"/>
<part name="U$4" library="fab" deviceset="FABRIC_PIN" device=""/>
<part name="U$5" library="fab" deviceset="FABRIC_PIN" device=""/>
<part name="U$6" library="fab" deviceset="FABRIC_PIN" device=""/>
<part name="U$7" library="fab" deviceset="FABRIC_PIN" device=""/>
</parts>
<sheets>
<sheet>
<plain>
</plain>
<busses>
</busses>
<nets>
<net name="N$1">
<segment>
<pinref part="U$5" gate="G$1" pin="1"/>
<pinref part="U$1" gate="G$1" pin="A"/>
</segment>
</net>
<net name="N$2">
<segment>
<pinref part="U$1" gate="G$1" pin="C"/>
<pinref part="R1" gate="G$1" pin="2"/>
</segment>
</net>
<net name="N$3">
<segment>
<pinref part="R1" gate="G$1" pin="1"/>
<pinref part="U$6" gate="G$1" pin="1"/>
</segment>
</net>
<net name="N$4">
<segment>
<pinref part="U$7" gate="G$1" pin="1"/>
<pinref part="S1" gate="G$1" pin="PIN1-2"/>
</segment>
</net>
<net name="N$5">
<segment>
<pinref part="S1" gate="G$1" pin="PIN3-4"/>
<pinref part="U$4" gate="G$1" pin="1"/>
</segment>
</net>
</nets>
</sheet>
</sheets>
</schematic>
</drawing>
</eagle>
