<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.0.1">
<drawing>
<schematic>
<libraries>
<library name="fab">
<packages>
<package name="DO41Z10">
<description>&lt;B&gt;DIODE&lt;/B&gt;&lt;p&gt;
diameter 2.54 mm, horizontal, grid 10.16 mm</description>
</package>
<package name="SOD123">
<description>&lt;b&gt;SMALL OUTLINE DIODE&lt;/b&gt;</description>
</package>
<package name="SOD-323F">
</package>
<package name="USB_B">
</package>
</packages>
<symbols>
<symbol name="ZENER">
<pin name="ANODE" direction="pas"/>
<pin name="CATHODE" direction="pas"/>
</symbol>
<symbol name="10104111-0001LF">
<pin name="VBUS" direction="pwr"/>
<pin name="D-" direction="pas"/>
<pin name="D+" direction="pas"/>
<pin name="GND" direction="pwr"/>
<pin name="S" direction="pwr"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="ZENER_DIODE" prefix="D" uservalue="yes">
<description>zener diode</description>
<gates>
<gate name="1" symbol="ZENER"/>
</gates>
<devices>
<device name="DO41Z10" package="DO41Z10">
<connects>
<connect gate="1" pin="ANODE" pad="A"/>
<connect gate="1" pin="CATHODE" pad="C"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="SOD123" package="SOD123">
<connects>
<connect gate="1" pin="ANODE" pad="ANODE"/>
<connect gate="1" pin="CATHODE" pad="CATHODE"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="" package="SOD-323F">
<connects>
<connect gate="1" pin="ANODE" pad="P$1"/>
<connect gate="1" pin="CATHODE" pad="P$2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="USBB" prefix="J">
<description>Conn USB Type A/B RCP 5 POS 0.65mm Solder RA SMD 5 Terminal 1 Port T/R</description>
<gates>
<gate name="G$1" symbol="10104111-0001LF"/>
</gates>
<devices>
<device name="USBB" package="USB_B">
<connects>
<connect gate="G$1" pin="D+" pad="3"/>
<connect gate="G$1" pin="D-" pad="2"/>
<connect gate="G$1" pin="GND" pad="4"/>
<connect gate="G$1" pin="S" pad="SHIELD SHIELD1"/>
<connect gate="G$1" pin="VBUS" pad="1"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
<library name="con-lstb">
<description>&lt;b&gt;Pin Headers&lt;/b&gt;&lt;p&gt;
Naming:&lt;p&gt;
MA = male&lt;p&gt;
# contacts - # rows&lt;p&gt;
W = angled&lt;p&gt;
&lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
<package name="MA04-1">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
</packages>
<symbols>
<symbol name="MA04-1">
<pin name="1" direction="pas"/>
<pin name="2" direction="pas"/>
<pin name="3" direction="pas"/>
<pin name="4" direction="pas"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="MA04-1" prefix="SV" uservalue="yes">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
<gates>
<gate name="1" symbol="MA04-1"/>
</gates>
<devices>
<device name="" package="MA04-1">
<connects>
<connect gate="1" pin="1" pad="1"/>
<connect gate="1" pin="2" pad="2"/>
<connect gate="1" pin="3" pad="3"/>
<connect gate="1" pin="4" pad="4"/>
</connects>
<technologies>
<technology name="">
<attribute name="MF" value=""/>
<attribute name="MPN" value=""/>
<attribute name="OC_FARNELL" value="unknown"/>
<attribute name="OC_NEWARK" value="unknown"/>
</technology>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<parts>
<part name="SV1" library="con-lstb" deviceset="MA04-1" device=""/>
<part name="D2" library="fab" deviceset="ZENER_DIODE" device=""/>
<part name="D1" library="fab" deviceset="ZENER_DIODE" device=""/>
<part name="J2" library="fab" deviceset="USBB" device="USBB"/>
</parts>
<sheets>
<sheet>
<plain>
</plain>
<busses>
</busses>
<nets>
<net name="VBUS">
<segment>
<pinref part="SV1" gate="1" pin="4"/>
<pinref part="J2" gate="G$1" pin="VBUS"/>
</segment>
</net>
<net name="GND">
<segment>
<pinref part="SV1" gate="1" pin="1"/>
<pinref part="D2" gate="1" pin="ANODE"/>
<pinref part="D1" gate="1" pin="ANODE"/>
<pinref part="J2" gate="G$1" pin="GND"/>
<pinref part="J2" gate="G$1" pin="S"/>
</segment>
</net>
<net name="N$3">
<segment>
<pinref part="SV1" gate="1" pin="2"/>
<pinref part="D1" gate="1" pin="CATHODE"/>
<pinref part="J2" gate="G$1" pin="D+"/>
</segment>
</net>
<net name="N$4">
<segment>
<pinref part="SV1" gate="1" pin="3"/>
<pinref part="D2" gate="1" pin="CATHODE"/>
<pinref part="J2" gate="G$1" pin="D-"/>
</segment>
</net>
</nets>
</sheet>
</sheets>
</schematic>
</drawing>
</eagle>
